\documentclass[final]{beamer}
\usetheme{IST}
\usepackage[orientation=portrait,size=a0,scale=1.4,debug]{beamerposter}  % poster size
\usepackage[absolute,overlay]{textpos}
\usepackage[utf8]{inputenc}

\setlength{\TPHorizModule}{1cm}
\setlength{\TPVertModule}{1cm}

\title{Integration of the in silico toxicology services in the eNanoMapper infrastructure }
\author{C. Helma, D. Gebele, M. Rautenberg}
\institute{\emph{in silico} toxicology gmbh, Basel, Switzerland}
\footer{Contact: \texttt{support@in-silico.ch}. Information: \texttt{www.in-silico.ch}}

\begin{document}

  \begin{frame}{}

    \begin{textblock}{40.5}(1,11)
      \begin{block}{Abstract}
        \input{./markdown_blocks/integration_summary}
      \end{block}

    \end{textblock}

    \begin{textblock}{40.5}(42.6,11)

      \begin{block}{Text}
        \input{./markdown_blocks/integration_text}
      \end{block}

    \end{textblock}



    \begin{textblock}{82.1}(1,28)
      \input{./markdown_blocks/integration_diagram}
    \end{textblock}

    \begin{textblock}{40.5}(1,90)

      \begin{exampleblock}{Links}
        \input{./markdown_blocks/integration_links}
      \end{exampleblock}

    \end{textblock}

    \begin{textblock}{40.5}(42.6,90)

      \begin{block}{References}
        \small\bibliography{references}
      \end{block}

    \end{textblock}


  \end{frame}

\end{document}
